SET NAMES utf8mb4;

CREATE TABLE `bs_sgc_df_xmgl` (
                                  `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
                                  `name` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查项名称',
                                  `dike_code` varchar(50) NOT NULL DEFAULT '' COMMENT '堤防code',
                                  `dike_name` varchar(50) NOT NULL DEFAULT '' COMMENT '堤防名称',
                                  `type` int NOT NULL DEFAULT '0' COMMENT '巡查类型 字典：patrol_maintenance_type',
                                  `category` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查类别字典：key_jf_patrol_category',
                                  `create_uid` varchar(32) NOT NULL DEFAULT '' COMMENT '创建人',
                                  `create_name` varchar(50) NOT NULL DEFAULT '' COMMENT '责任人name',
                                  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
                                  `update_time` datetime DEFAULT NULL COMMENT '最近修改时间',
                                  `update_uid` varchar(50) NOT NULL DEFAULT '0' COMMENT '修改人id',
                                  `remark` text COMMENT '备注',
                                  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=24 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci

 ROW_FORMAT=DYNAMIC COMMENT='堤防巡视项目管理表';

CREATE TABLE `bs_sgc_df_xcitem` (
                                    `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
                                    `checking_id` int NOT NULL DEFAULT '0' COMMENT '项目id',
                                    `parts` varchar(100) NOT NULL DEFAULT '' COMMENT '检查部位',
                                    `content` varchar(500) NOT NULL DEFAULT '' COMMENT '检查内容',
                                    `remark` text COMMENT '备注',
                                    `create_uid` varchar(32) NOT NULL DEFAULT '' COMMENT '创建人',
                                    `create_time` datetime DEFAULT NULL COMMENT '创建时间',
                                    `update_uid` varchar(32) NOT NULL DEFAULT '' COMMENT '最近修改人',
                                    `update_time` datetime DEFAULT NULL COMMENT '最近修改时间',
                                    PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=455 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci

 ROW_FORMAT=DYNAMIC COMMENT='堤防巡视检查项表';


CREATE TABLE `bs_sgc_df_xsxcjl` (
                                    `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
                                    `checking_id` int NOT NULL DEFAULT '0' COMMENT '巡查项目id',
                                    `status` int NOT NULL DEFAULT '0' COMMENT '巡查状态字典:patrol_maintenance_status',
                                    `checking_name` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查名称',
                                    `type` int NOT NULL DEFAULT '0' COMMENT '巡查类型 字典：patrol_maintenance_type',
                                    `category` int NOT NULL DEFAULT '0' COMMENT '巡查类别字典：patrol_maintenance_category',
                                    `duty_holder_name` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查责任人name',
                                    `duty_holder_id` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查责任人id',
                                    `dike_code` varchar(50) NOT NULL DEFAULT '' COMMENT '堤防code',
                                    `dike_name` varchar(50) NOT NULL DEFAULT '' COMMENT '堤防名称',
                                    `start_date` datetime DEFAULT NULL COMMENT '巡查开始时间',
                                    `end_date` datetime DEFAULT NULL COMMENT '巡查结束时间',
                                    `scope` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查范围',
                                    `create_uid` varchar(32) NOT NULL DEFAULT '' COMMENT '创建人id',
                                    `create_name` varchar(32) NOT NULL DEFAULT '' COMMENT '创建人名称',
                                    `create_time` datetime DEFAULT NULL COMMENT '创建时间',
                                    `update_time` datetime DEFAULT NULL COMMENT '最近修改时间',
                                    `update_uid` varchar(50) NOT NULL DEFAULT '0' COMMENT '修改人id',
                                    `remark` text COMMENT '备注',
                                    PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=23 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci

 ROW_FORMAT=DYNAMIC COMMENT='堤防巡视记录管理表';

CREATE TABLE `bs_sgc_df_xcqx` (
                                  `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
                                  `checking_id` int NOT NULL DEFAULT '0' COMMENT '巡查项目id',
                                  `record_id` int NOT NULL DEFAULT '0' COMMENT '记录id',
                                  `parts` varchar(100) NOT NULL DEFAULT '' COMMENT '检查部位',
                                  `status` int NOT NULL DEFAULT '0' COMMENT '巡查状态字典:patrol_maintenance_status',
                                  `checking_name` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查名称',
                                  `type` int NOT NULL DEFAULT '0' COMMENT '巡查类型 字典：patrol_maintenance_type',
                                  `category` int NOT NULL DEFAULT '0' COMMENT '巡查类别 字典：patrol_maintenance_category',
                                  `duty_holder_name` varchar(50) NOT NULL DEFAULT '' COMMENT '缺陷人name',
                                  `duty_holder_id` varchar(50) NOT NULL DEFAULT '' COMMENT '缺陷人name',
                                  `dike_code` varchar(50) NOT NULL DEFAULT '' COMMENT '堤防code',
                                  `dike_name` varchar(50) NOT NULL DEFAULT '' COMMENT '堤防名称',
                                  `start_date` datetime DEFAULT NULL COMMENT '缺陷开始时间',
                                  `end_date` datetime DEFAULT NULL COMMENT '缺陷结束时间',
                                  `content` varchar(200) NOT NULL DEFAULT '' COMMENT '描述',
                                  `position` varchar(200) NOT NULL DEFAULT '' COMMENT '问题位置',
                                  `problem_level` int NOT NULL DEFAULT '0' COMMENT '问题等级 字典 patrol_maintenance_level',
                                  `doc` text COMMENT '文档',
                                  `remark` text COMMENT '备注',
                                  `create_uid` varchar(32) NOT NULL DEFAULT '' COMMENT '创建人',
                                  `update_time` datetime DEFAULT NULL COMMENT '最近修改时间',
                                  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
                                  `update_uid` varchar(50) NOT NULL DEFAULT '0' COMMENT '修改人id',
                                  `item_id` int DEFAULT NULL,
                                  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=28 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci

 ROW_FORMAT=DYNAMIC COMMENT='堤防巡视记录缺陷管理表';

CREATE TABLE `bs_sgc_df_xcyj` (
                                  `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
                                  `checking_id` int NOT NULL DEFAULT '0' COMMENT '巡查项目id',
                                  `problem_id` int NOT NULL DEFAULT '0' COMMENT '缺陷id',
                                  `status` int NOT NULL DEFAULT '0' COMMENT '巡查状态字典:patrol_maintenance_status',
                                  `name` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查名称',
                                  `type` int NOT NULL DEFAULT '0' COMMENT '巡查类型 字典：patrol_maintenance_type',
                                  `category` int NOT NULL DEFAULT '0' COMMENT '巡查类别 字典：patrol_maintenance_category',
                                  `dike_code` varchar(50) NOT NULL DEFAULT '' COMMENT '堤防code',
                                  `dike_name` varchar(50) NOT NULL DEFAULT '' COMMENT '堤防名称',
                                  `start_date` datetime DEFAULT NULL COMMENT '维养开始时间',
                                  `end_date` datetime DEFAULT NULL COMMENT '维养结束时间',
                                  `position` varchar(200) NOT NULL DEFAULT '' COMMENT '问题位置',
                                  `content` varchar(200) NOT NULL DEFAULT '' COMMENT '描述',
                                  `problem_level` int NOT NULL DEFAULT '0' COMMENT '问题等级 字典 patrol_maintenance_level',
                                  `create_uid` varchar(50) NOT NULL DEFAULT '' COMMENT '数据创建人id',
                                  `duty_holder_name` varchar(50) NOT NULL DEFAULT '' COMMENT '维养责任人名称',
                                  `duty_holder_id` varchar(50) NOT NULL DEFAULT '' COMMENT '维养责任人id',
                                  `doc` text COMMENT '文档',
                                  `remark` text COMMENT '备注',
                                  `update_uid` varchar(32) NOT NULL DEFAULT '' COMMENT '最近修改人',
                                  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
                                  `update_time` datetime DEFAULT NULL COMMENT '最近修改时间',
                                  `record_id` int DEFAULT NULL,
                                  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=21 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci

 ROW_FORMAT=DYNAMIC COMMENT='堤防巡视养护管理表';

CREATE TABLE `bs_sgc_sz_xmgl` (
                                  `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
                                  `name` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查项名称',
                                  `waga_code` varchar(50) NOT NULL DEFAULT '' COMMENT '水闸code',
                                  `waga_name` varchar(50) NOT NULL DEFAULT '' COMMENT '水闸名称',
                                  `type` int NOT NULL DEFAULT '0' COMMENT '巡查类型 字典：patrol_maintenance_type',
                                  `category` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查类别字典：key_jf_patrol_category',
                                  `create_uid` varchar(32) NOT NULL DEFAULT '' COMMENT '创建人',
                                  `create_name` varchar(50) NOT NULL DEFAULT '' COMMENT '责任人name',
                                  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
                                  `update_time` datetime DEFAULT NULL COMMENT '最近修改时间',
                                  `update_uid` varchar(50) NOT NULL DEFAULT '0' COMMENT '修改人id',
                                  `remark` text COMMENT '备注',
                                  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=24 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci

 ROW_FORMAT=DYNAMIC COMMENT='水闸巡视项目管理表';

CREATE TABLE `bs_sgc_sz_xcitem` (
                                    `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
                                    `checking_id` int NOT NULL DEFAULT '0' COMMENT '项目id',
                                    `parts` varchar(100) NOT NULL DEFAULT '' COMMENT '检查部位',
                                    `content` varchar(500) NOT NULL DEFAULT '' COMMENT '检查内容',
                                    `remark` text COMMENT '备注',
                                    `create_uid` varchar(32) NOT NULL DEFAULT '' COMMENT '创建人',
                                    `create_time` datetime DEFAULT NULL COMMENT '创建时间',
                                    `update_uid` varchar(32) NOT NULL DEFAULT '' COMMENT '最近修改人',
                                    `update_time` datetime DEFAULT NULL COMMENT '最近修改时间',
                                    PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=455 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci

 ROW_FORMAT=DYNAMIC COMMENT='水闸巡视检查项表';


CREATE TABLE `bs_sgc_sz_xsxcjl` (
                                    `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
                                    `checking_id` int NOT NULL DEFAULT '0' COMMENT '巡查项目id',
                                    `status` int NOT NULL DEFAULT '0' COMMENT '巡查状态字典:patrol_maintenance_status',
                                    `checking_name` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查名称',
                                    `type` int NOT NULL DEFAULT '0' COMMENT '巡查类型 字典：patrol_maintenance_type',
                                    `category` int NOT NULL DEFAULT '0' COMMENT '巡查类别字典：patrol_maintenance_category',
                                    `duty_holder_name` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查责任人name',
                                    `duty_holder_id` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查责任人id',
                                    `waga_code` varchar(50) NOT NULL DEFAULT '' COMMENT '水闸code',
                                    `waga_name` varchar(50) NOT NULL DEFAULT '' COMMENT '水闸名称',
                                    `start_date` datetime DEFAULT NULL COMMENT '巡查开始时间',
                                    `end_date` datetime DEFAULT NULL COMMENT '巡查结束时间',
                                    `scope` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查范围',
                                    `create_uid` varchar(32) NOT NULL DEFAULT '' COMMENT '创建人id',
                                    `create_name` varchar(32) NOT NULL DEFAULT '' COMMENT '创建人名称',
                                    `create_time` datetime DEFAULT NULL COMMENT '创建时间',
                                    `update_time` datetime DEFAULT NULL COMMENT '最近修改时间',
                                    `update_uid` varchar(50) NOT NULL DEFAULT '0' COMMENT '修改人id',
                                    `remark` text COMMENT '备注',
                                    PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=23 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci

 ROW_FORMAT=DYNAMIC COMMENT='水闸巡视记录管理表';

CREATE TABLE `bs_sgc_sz_xcqx` (
                                  `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
                                  `checking_id` int NOT NULL DEFAULT '0' COMMENT '巡查项目id',
                                  `record_id` int NOT NULL DEFAULT '0' COMMENT '记录id',
                                  `parts` varchar(100) NOT NULL DEFAULT '' COMMENT '检查部位',
                                  `status` int NOT NULL DEFAULT '0' COMMENT '巡查状态字典:patrol_maintenance_status',
                                  `checking_name` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查名称',
                                  `type` int NOT NULL DEFAULT '0' COMMENT '巡查类型 字典：patrol_maintenance_type',
                                  `category` int NOT NULL DEFAULT '0' COMMENT '巡查类别 字典：patrol_maintenance_category',
                                  `duty_holder_name` varchar(50) NOT NULL DEFAULT '' COMMENT '缺陷人name',
                                  `duty_holder_id` varchar(50) NOT NULL DEFAULT '' COMMENT '缺陷人name',
                                  `waga_code` varchar(50) NOT NULL DEFAULT '' COMMENT '水闸code',
                                  `waga_name` varchar(50) NOT NULL DEFAULT '' COMMENT '水闸名称',
                                  `start_date` datetime DEFAULT NULL COMMENT '缺陷开始时间',
                                  `end_date` datetime DEFAULT NULL COMMENT '缺陷结束时间',
                                  `content` varchar(200) NOT NULL DEFAULT '' COMMENT '描述',
                                  `position` varchar(200) NOT NULL DEFAULT '' COMMENT '问题位置',
                                  `problem_level` int NOT NULL DEFAULT '0' COMMENT '问题等级 字典 patrol_maintenance_level',
                                  `doc` text COMMENT '文档',
                                  `remark` text COMMENT '备注',
                                  `create_uid` varchar(32) NOT NULL DEFAULT '' COMMENT '创建人',
                                  `update_time` datetime DEFAULT NULL COMMENT '最近修改时间',
                                  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
                                  `update_uid` varchar(50) NOT NULL DEFAULT '0' COMMENT '修改人id',
                                  `item_id` int DEFAULT NULL,
                                  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=28 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci

 ROW_FORMAT=DYNAMIC COMMENT='水闸巡视记录缺陷管理表';

CREATE TABLE `bs_sgc_sz_xcyj` (
                                  `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
                                  `checking_id` int NOT NULL DEFAULT '0' COMMENT '巡查项目id',
                                  `problem_id` int NOT NULL DEFAULT '0' COMMENT '缺陷id',
                                  `status` int NOT NULL DEFAULT '0' COMMENT '巡查状态字典:patrol_maintenance_status',
                                  `name` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查名称',
                                  `type` int NOT NULL DEFAULT '0' COMMENT '巡查类型 字典：patrol_maintenance_type',
                                  `category` int NOT NULL DEFAULT '0' COMMENT '巡查类别 字典：patrol_maintenance_category',
                                  `waga_code` varchar(50) NOT NULL DEFAULT '' COMMENT '水闸code',
                                  `waga_name` varchar(50) NOT NULL DEFAULT '' COMMENT '水闸名称',
                                  `start_date` datetime DEFAULT NULL COMMENT '维养开始时间',
                                  `end_date` datetime DEFAULT NULL COMMENT '维养结束时间',
                                  `position` varchar(200) NOT NULL DEFAULT '' COMMENT '问题位置',
                                  `content` varchar(200) NOT NULL DEFAULT '' COMMENT '描述',
                                  `problem_level` int NOT NULL DEFAULT '0' COMMENT '问题等级 字典 patrol_maintenance_level',
                                  `create_uid` varchar(50) NOT NULL DEFAULT '' COMMENT '数据创建人id',
                                  `duty_holder_name` varchar(50) NOT NULL DEFAULT '' COMMENT '维养责任人名称',
                                  `duty_holder_id` varchar(50) NOT NULL DEFAULT '' COMMENT '维养责任人id',
                                  `doc` text COMMENT '文档',
                                  `remark` text COMMENT '备注',
                                  `update_uid` varchar(32) NOT NULL DEFAULT '' COMMENT '最近修改人',
                                  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
                                  `update_time` datetime DEFAULT NULL COMMENT '最近修改时间',
                                  `record_id` int DEFAULT NULL,
                                  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=21 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci

 ROW_FORMAT=DYNAMIC COMMENT='水闸巡视养护管理表';






CREATE TABLE `bs_sgc_dw_xmgl` (
                                  `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
                                  `name` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查项名称',
                                  `dike_code` varchar(50) NOT NULL DEFAULT '' COMMENT '工程code',
                                  `dike_name` varchar(50) NOT NULL DEFAULT '' COMMENT '工程名称',
                                  `type` int NOT NULL DEFAULT '0' COMMENT '巡查类型 字典：animal_check_type',
                                  `category` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查类别字典：animal_prevention_category',
                                  `create_uid` varchar(32) NOT NULL DEFAULT '' COMMENT '创建人',
                                  `create_name` varchar(50) NOT NULL DEFAULT '' COMMENT '责任人name',
                                  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
                                  `update_time` datetime DEFAULT NULL COMMENT '最近修改时间',
                                  `update_uid` varchar(50) NOT NULL DEFAULT '0' COMMENT '修改人id',
                                  `remark` text COMMENT '备注',
                                  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=33 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='堤防巡视项目管理表';


CREATE TABLE `bs_sgc_dw_xcitem` (
                                    `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
                                    `checking_id` int NOT NULL DEFAULT '0' COMMENT '项目id',
                                    `parts` varchar(100) NOT NULL DEFAULT '' COMMENT '检查部位',
                                    `content` varchar(500) NOT NULL DEFAULT '' COMMENT '检查内容',
                                    `remark` text COMMENT '备注',
                                    `create_uid` varchar(32) NOT NULL DEFAULT '' COMMENT '创建人',
                                    `create_time` datetime DEFAULT NULL COMMENT '创建时间',
                                    `update_uid` varchar(32) NOT NULL DEFAULT '' COMMENT '最近修改人',
                                    `update_time` datetime DEFAULT NULL COMMENT '最近修改时间',
                                    PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=480 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='堤防巡视检查项表';

CREATE TABLE `bs_sgc_dw_xsxcjl` (
                                    `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
                                    `checking_id` int NOT NULL DEFAULT '0' COMMENT '巡查项目id',
                                    `status` int NOT NULL DEFAULT '0' COMMENT '巡查状态字典:animal_check_status',
                                    `checking_name` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查名称',
                                    `type` int NOT NULL DEFAULT '0' COMMENT '巡查类型 字典：animal_check_type',
                                    `category` int NOT NULL DEFAULT '0' COMMENT '巡查类别字典：animal_prevention_category',
                                    `duty_holder_name` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查责任人name',
                                    `duty_holder_id` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查责任人id',
                                    `dike_code` varchar(50) NOT NULL DEFAULT '' COMMENT '工程code',
                                    `dike_name` varchar(50) NOT NULL DEFAULT '' COMMENT '工程名称',
                                    `start_date` datetime DEFAULT NULL COMMENT '巡查开始时间',
                                    `end_date` datetime DEFAULT NULL COMMENT '巡查结束时间',
                                    `scope` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查范围',
                                    `create_uid` varchar(32) NOT NULL DEFAULT '' COMMENT '创建人id',
                                    `create_name` varchar(32) NOT NULL DEFAULT '' COMMENT '创建人名称',
                                    `create_time` datetime DEFAULT NULL COMMENT '创建时间',
                                    `update_time` datetime DEFAULT NULL COMMENT '最近修改时间',
                                    `update_uid` varchar(50) NOT NULL DEFAULT '0' COMMENT '修改人id',
                                    `remark` text COMMENT '备注',
                                    PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=69 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='堤防巡视记录管理表';


CREATE TABLE `bs_sgc_dw_xcqx` (
                                  `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
                                  `checking_id` int NOT NULL DEFAULT '0' COMMENT '巡查项目id',
                                  `record_id` int NOT NULL DEFAULT '0' COMMENT '记录id',
                                  `parts` varchar(100) NOT NULL DEFAULT '' COMMENT '检查部位',
                                  `status` int NOT NULL DEFAULT '0' COMMENT '巡查状态字典:animal_check_status',
                                  `checking_name` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查名称',
                                  `type` int NOT NULL DEFAULT '0' COMMENT '巡查类型 字典：animal_check_type',
                                  `category` int NOT NULL DEFAULT '0' COMMENT '巡查类别 字典：animal_prevention_category',
                                  `duty_holder_name` varchar(50) NOT NULL DEFAULT '' COMMENT '缺陷人name',
                                  `duty_holder_id` varchar(50) NOT NULL DEFAULT '' COMMENT '缺陷人name',
                                  `dike_code` varchar(50) NOT NULL DEFAULT '' COMMENT '工程code',
                                  `dike_name` varchar(50) NOT NULL DEFAULT '' COMMENT '工程名称',
                                  `start_date` datetime DEFAULT NULL COMMENT '缺陷开始时间',
                                  `end_date` datetime DEFAULT NULL COMMENT '缺陷结束时间',
                                  `content` varchar(200) NOT NULL DEFAULT '' COMMENT '描述',
                                  `position` varchar(200) NOT NULL DEFAULT '' COMMENT '问题位置',
                                  `problem_level` int NOT NULL DEFAULT '0' COMMENT '问题等级 字典 patrol_maintenance_level',
                                  `doc` text COMMENT '文档',
                                  `remark` text COMMENT '备注',
                                  `create_uid` varchar(32) NOT NULL DEFAULT '' COMMENT '创建人',
                                  `update_time` datetime DEFAULT NULL COMMENT '最近修改时间',
                                  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
                                  `update_uid` varchar(50) NOT NULL DEFAULT '0' COMMENT '修改人id',
                                  `item_id` int DEFAULT NULL,
                                  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=98 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='堤防巡视记录缺陷管理表';


CREATE TABLE `bs_sgc_dw_xcyj` (
                                  `id` int NOT NULL AUTO_INCREMENT COMMENT 'id',
                                  `checking_id` int NOT NULL DEFAULT '0' COMMENT '巡查项目id',
                                  `problem_id` int NOT NULL DEFAULT '0' COMMENT '缺陷id',
                                  `status` int NOT NULL DEFAULT '0' COMMENT '巡查状态字典:animal_check_status',
                                  `name` varchar(50) NOT NULL DEFAULT '' COMMENT '巡查名称',
                                  `type` int NOT NULL DEFAULT '0' COMMENT '巡查类型 字典：animal_check_type',
                                  `category` int NOT NULL DEFAULT '0' COMMENT '巡查类别 字典：animal_prevention_category',
                                  `dike_code` varchar(50) NOT NULL DEFAULT '' COMMENT '工程code',
                                  `dike_name` varchar(50) NOT NULL DEFAULT '' COMMENT '工程名称',
                                  `start_date` datetime DEFAULT NULL COMMENT '维养开始时间',
                                  `end_date` datetime DEFAULT NULL COMMENT '维养结束时间',
                                  `position` varchar(200) NOT NULL DEFAULT '' COMMENT '问题位置',
                                  `content` varchar(200) NOT NULL DEFAULT '' COMMENT '描述',
                                  `problem_level` int NOT NULL DEFAULT '0' COMMENT '问题等级 字典 patrol_maintenance_level',
                                  `create_uid` varchar(50) NOT NULL DEFAULT '' COMMENT '数据创建人id',
                                  `duty_holder_name` varchar(50) NOT NULL DEFAULT '' COMMENT '维养责任人名称',
                                  `duty_holder_id` varchar(50) NOT NULL DEFAULT '' COMMENT '维养责任人id',
                                  `doc` text COMMENT '文档',
                                  `remark` text COMMENT '备注',
                                  `update_uid` varchar(32) NOT NULL DEFAULT '' COMMENT '最近修改人',
                                  `create_time` datetime DEFAULT NULL COMMENT '创建时间',
                                  `update_time` datetime DEFAULT NULL COMMENT '最近修改时间',
                                  `record_id` int DEFAULT NULL,
                                  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=58 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci ROW_FORMAT=DYNAMIC COMMENT='堤防巡视养护管理表';



alter table bs_sgc_qqjd_layer add column is_need_cluster varchar(50) default null COMMENT '是否需要聚合';
alter table bs_sgc_qqjd_layer add column is_support_fast_query varchar(50) default null COMMENT '是否支持一键搜索';





