/*
 Navicat Premium Data Transfer

 Source Server         : shuili
 Source Server Type    : MySQL
 Source Server Version : 50738
 Source Host           : rm-7xv36ek6qb84h9utmfo.mysql.rds.aliyuncs.com:3333
 Source Schema         : sgc_yg

 Target Server Type    : MySQL
 Target Server Version : 50738
 File Encoding         : 65001

 Date: 18/01/2024 11:23:26
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for bs_sgc_df_gcgl
-- ----------------------------
DROP TABLE IF EXISTS `bs_sgc_df_gcgl`;
CREATE TABLE `bs_sgc_df_gcgl`  (
  `id` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `DIKE_CODE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '堤防编码',
  `ENGINEERING_MANAGEMENT_UNIT` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '工程管理单位',
  `MANAGEMENT_UNIT_NATURE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '工程管理单位性质',
  `ENGINEERING_MANAGEMENT_OWNERSHIP` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '工程管理单位权属',
  `ENGINEERING_MANAGEMENT_PERSON` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '工程管理单位责任人',
  `ENGINEERING_MANAGEMENT_POSITION` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '工程管理单位责任人职务',
  `ENGINEERING_MANAGEMENT_PHONE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '工程管理单位责任人手机号码',
  `WATER_ADMINISTRATIVE_DEPARTMENT` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '水行政主管部门',
  `ADMINISTRATION_DEPARTMENT_NATURE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '水行政主管部门性质',
  `ADMINISTRATION_DEPARTMENT_PERSON` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `ADMINISTRATION_DEPARTMENT_POSITION` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `ADMINISTRATION_DEPARTMENT_PHONE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `CENTRALIZED_MANAGEMENT_DEPARTMENT` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '行业归口管理部门',
  `MANAGEMENT_DELIMITATION` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '管理范围划界',
  `DELIMITATION_TIME` datetime(0) NULL DEFAULT NULL COMMENT '完成时间',
  `DELIMITATION_EVIDENCE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '证明材料',
  `MANAGEMENT_CONFIRMATION` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '管理范围确权',
  `CONFIRMATION_TIME` datetime(0) NULL DEFAULT NULL,
  `CONFIRMATION_EVIDENCE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `PROTECTION_DELIMITATION` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '保护范围划界',
  `PROTECTION_TIME` datetime(0) NULL DEFAULT NULL,
  `PROTECTION_EVIDENCE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `GATE_OPERATING_PROCEDURES` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '闸门操作规程',
  `WATER_GATE_CONTROL_OPERATION` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '水闸控制运用计划(方案)批复文件',
  `ENGINEERING_COMPLETION_ACCEPTANCE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '工程竣工验收鉴定书',
  `ENGINEERING_CHART` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '工程图表',
  `ENGINEERING_PANORAMIC_PHOTOS` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '工程全景照片',
  `APPROVAL_DOCUMENTS_DOWNGRADE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '降等批复文件',
  `CREATE_UID` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `UPDATE_UID` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `CREATE_TIME` datetime(0) NULL DEFAULT NULL,
  `UPDATE_TIME` datetime(0) NULL DEFAULT NULL,
  `PRO_CODE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `PRO_NO` int(11) NULL DEFAULT NULL,
  `REMARK` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `OWER_DEPT` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `RELATIONS` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `EFF_DATE` datetime(0) NULL DEFAULT NULL COMMENT '记录生效时间',
  `EXPR_DATE` datetime(0) NULL DEFAULT NULL COMMENT '记录失效时间',
  `monitoring_type` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '监控类型',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '堤防工程管理信息' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Table structure for bs_sgc_df_jbxx
-- ----------------------------
DROP TABLE IF EXISTS `bs_sgc_df_jbxx`;
CREATE TABLE `bs_sgc_df_jbxx`  (
  `ID` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL DEFAULT '',
  `DIKE_NAME` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '堤防名称',
  `ADCD_START` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '起点行政区划',
  `DIKE_CODE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '堤防编码',
  `PLOT_EMBANKMENTS` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '标绘堤防',
  `ADCD_END` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '终点行政区划',
  `DIKE_START_NUM` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '起点桩号',
  `DIKE_END_NUM` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '终点桩号',
  `DIKE_TYPE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '堤防类型',
  `IS_FLOOD_STORAGE_DETENTION` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '是否为蓄滞洪区堤防',
  `STORAGE_DETENTION_AREA_NAME` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '所在蓄滞洪区名称',
  `AREA_STARTING_STATION_NUMBER` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `AREA_END_STATION_NUMBER` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `TOTAL_LENGTH_FLOOD_STORAGE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '堤防蓄滞洪区段总长度(m)',
  `FLOOD_STORAGE_DETENTION_AREAS_EXPLANATION` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '蓄滞洪区特殊情况说明',
  `CROSS_BORDER_SITUATION` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '堤防跨界情况',
  `DIKE_PATT` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '堤防型式',
  `COMP_DATE` datetime(0) NULL DEFAULT NULL COMMENT '建成时间',
  `RECENT_COMPLIANCE_REINFORCEMENT_STATUS` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '最近达标加固完工状态',
  `RECENT_COMPLIANCE_REINFORCEMENT_TIME` datetime(0) NULL DEFAULT NULL COMMENT '最近达标加固完成时间',
  `ENG_TASK` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '工程任务',
  `DIKE_GRAD` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '堤防级别',
  `DESIGN_FLOOD_CONTROL` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '设计防洪（潮）标准[重现期（年）]',
  `DIKE_LEN` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '堤防长度(m)',
  `PLANNING_FLOOD_CONTROL` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '规划防洪（潮）标准[重现期（年）]',
  `EMBANKMENT_LENGTH_PLANNING_STANDARDS` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '达到规划标准的堤防长度(m)',
  `POPULATION_PROTECTION` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '保护人口（单位：万人）',
  `PROTECTING_FARMLAND` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '保护农田（单位：万亩）',
  `CRITICAL_INFRASTRUCTURE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '重要基础设施',
  `CREATE_UID` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `UPDATE_UID` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `CREATE_TIME` datetime(0) NULL DEFAULT NULL,
  `UPDATE_TIME` datetime(0) NULL DEFAULT NULL,
  `PRO_CODE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `PRO_NO` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `OWER_DEPT` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `REMARK` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `RELATIONS` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '关联字段1',
  `EFF_DATE` datetime(0) NULL DEFAULT NULL COMMENT '记录生效时间',
  `EXPR_DATE` datetime(0) NULL DEFAULT NULL COMMENT '记录失效时间',
  `adcd` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '行政区划',
  `river_location` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '所在河流',
  `riverside_classification` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '河流岸别',
  `lake_name` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '所在湖泊名称',
  `coastline_name` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '所在海岸名称',
  PRIMARY KEY (`ID`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '堤防基本信息' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Table structure for bs_sgc_sz_gcgl
-- ----------------------------
DROP TABLE IF EXISTS `bs_sgc_sz_gcgl`;
CREATE TABLE `bs_sgc_sz_gcgl`  (
  `id` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `WAGA_CODE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '水闸编码',
  `ENGINEERING_MANAGEMENT_UNIT` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '工程管理单位',
  `MANAGEMENT_UNIT_NATURE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '工程管理单位性质',
  `ENGINEERING_MANAGEMENT_OWNERSHIP` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '工程管理单位权属',
  `ENGINEERING_MANAGEMENT_PERSON` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '工程管理单位责任人',
  `ENGINEERING_MANAGEMENT_POSITION` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '工程管理单位责任人职务',
  `ENGINEERING_MANAGEMENT_PHONE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '工程管理单位责任人手机号码',
  `WATER_ADMINISTRATIVE_DEPARTMENT` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '水行政主管部门',
  `ADMINISTRATION_DEPARTMENT_NATURE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '水行政主管部门性质',
  `ADMINISTRATION_DEPARTMENT_PERSON` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `ADMINISTRATION_DEPARTMENT_POSITION` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `ADMINISTRATION_DEPARTMENT_PHONE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `CENTRALIZED_MANAGEMENT_DEPARTMENT` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '行业归口管理部门',
  `MANAGEMENT_DELIMITATION` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '管理范围划界',
  `DELIMITATION_TIME` datetime(0) NULL DEFAULT NULL COMMENT '完成时间',
  `DELIMITATION_EVIDENCE` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '证明材料',
  `MANAGEMENT_CONFIRMATION` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '管理范围确权',
  `CONFIRMATION_TIME` datetime(0) NULL DEFAULT NULL,
  `CONFIRMATION_EVIDENCE` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL,
  `PROTECTION_DELIMITATION` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '保护范围划界',
  `PROTECTION_TIME` datetime(0) NULL DEFAULT NULL,
  `PROTECTION_EVIDENCE` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL,
  `GATE_OPERATING_PROCEDURES` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '闸门操作规程',
  `WATER_GATE_CONTROL_OPERATION` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '水闸控制运用计划(方案)批复文件',
  `ENGINEERING_COMPLETION_ACCEPTANCE` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '工程竣工验收鉴定书',
  `ENGINEERING_CHART` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '工程图表',
  `ENGINEERING_PANORAMIC_PHOTOS` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '工程全景照片',
  `APPROVAL_DOCUMENTS_DOWNGRADE` text CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL COMMENT '降等批复文件',
  `CREATE_UID` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `UPDATE_UID` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `CREATE_TIME` datetime(0) NULL DEFAULT NULL,
  `UPDATE_TIME` datetime(0) NULL DEFAULT NULL,
  `PRO_CODE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `PRO_NO` int(11) NULL DEFAULT NULL,
  `REMARK` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `OWER_DEPT` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `RELATIONS` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `EFF_DATE` datetime(0) NULL DEFAULT NULL COMMENT '记录生效时间',
  `EXPR_DATE` datetime(0) NULL DEFAULT NULL COMMENT '记录失效时间',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '水闸工程管理信息' ROW_FORMAT = Dynamic;

-- ----------------------------
-- Table structure for bs_sgc_sz_jbxx
-- ----------------------------
DROP TABLE IF EXISTS `bs_sgc_sz_jbxx`;
CREATE TABLE `bs_sgc_sz_jbxx`  (
  `id` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NOT NULL,
  `WAGA_NAME` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '水闸名称',
  `adcd` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '行政区划',
  `WAGA_CODE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '水闸编码',
  `WAGA_LOC` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '所在位置',
  `plotting_sluice` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '标绘水闸',
  `ACCEPTANCE_STATUS` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '验收情况',
  `RISK_ELIMINATION_STATUS` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '除险加固情况',
  `IS_HUB_PROJECT` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '是否为枢纽工程',
  `IS_GATE_STATION` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '是否为闸站工程',
  `IS_SET_GATE_PROJECT` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '是否为套闸工程',
  `WAGA_TYPE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '水闸类型',
  `DSLCFL` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '设计过闸流量（m³/s）',
  `CHLCFL` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '校核过闸流量（m³/s）',
  `ENG_SCAL` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '工程规模',
  `MAIN_BUILD_GRAD` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '建筑物级别',
  `DSRCIN` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '设计标准[重现期（年）]',
  `CHRCIN` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '校核标准[重现期（年）]',
  `HISTORICAL_MAXIMUM_GATE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '历史最大过闸流量(m³/s)',
  `HISTORICAL_MAXIMUM_DATE` datetime(0) NULL DEFAULT NULL COMMENT '历史最大过闸流量日期',
  `DESIGN_SEISMIC_INTENSITY` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '设计地震烈度',
  `GAOR_NUM` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '闸孔数量',
  `GAOR_TOT_NET_WID` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '闸孔总净宽(m)',
  `GTST` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '闸门型式',
  `HOISTS_NUMBER` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '启闭机数量',
  `OBSERVATION_PROJECT` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '观测项目',
  `LOCK_CHAMBER_STRUCTURE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '闸室结构',
  `MACHINE_FORM` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '启闭机形式',
  `ENDSST` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '消能方式',
  `AUTOMATION_CONTROL` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '自动化控制',
  `CREATE_UID` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `UPDATE_UID` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `CREATE_TIME` datetime(0) NULL DEFAULT NULL,
  `UPDATE_TIME` datetime(0) NULL DEFAULT NULL,
  `PRO_NO` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `PRO_CODE` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  `RELATION` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '关联字段1',
  `COMPLETION_TIME` datetime(0) NULL DEFAULT NULL COMMENT '建成时间',
  `COMPLETION_ACCEPTANCE_TIME` datetime(0) NULL DEFAULT NULL COMMENT '竣工验收时间',
  `RECENT_COMPLETION_TIME` datetime(0) NULL DEFAULT NULL COMMENT '最近除险加固完工时间',
  `HUB_BUILDINGS` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '枢纽建筑物',
  `AUXILIARY_GATE_HOLES` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '副闸闸孔数量',
  `AUXILIARY_GATE_HOLES_WIDTH` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL COMMENT '副闸闸孔总净宽',
  `EFF_DATE` datetime(0) NULL DEFAULT NULL COMMENT '记录生效时间',
  `EXPR_DATE` datetime(0) NULL DEFAULT NULL COMMENT '记录失效时间',
  `remark` varchar(255) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci NULL DEFAULT NULL,
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB CHARACTER SET = utf8mb4 COLLATE = utf8mb4_general_ci COMMENT = '水闸工程基础信息' ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
